0 hours5 hours10 hours15 hours20 hours25 hours# 0# 100# 200# 300# 400# 500Registry Test: Elapsed Time (OSF)Registry Test: Elapsed Time (IBM)

Elapsed time from start of test suite (hours).Serial number of test case. Each represents 100 users.

0 seconds200 seconds400 seconds600 seconds800 seconds1000 seconds1200 seconds1400 seconds

0 hours

5 hours

10 hours

15 hours

20 hours

25 hoursRegistry Test: Case Time (OSF)Registry Test: Case Time (IBM)

Duration of test case (seconds).Time since test suite started (hours).900 seconds is 15 minutes.N=503.There are 503 observations because there are 502 test cases. Observations are obtained before the first test case, and following each subsequent test case.

Bar:From: (>)To: (£)Count:Percent:111011.2%210120149198%32013012.4%43014012.4%54015011.2%650160100%76017011.2%87018011.2%98019011.2%1090110011.2%-ModeBar:From: (>)To: (£)Count:Percent:110011000%211012000%312013000%41301409218.4%514015022544.9%615016016132.1%716017081.6%81701803.6%91801901.2%101902001.2%-Mode

Bar:From: (>)To: (£)Count:Percent:1110100%210120149398.4%32013012.4%43014011.2%54015011.2%650160100%76017012.4%870180100%98019011.2%10901100100%-ModeBar:From: (>)To: (£)Count:Percent:110011000%21101206112.2%312013028657.1%413014013927.7%514015051%61501601.2%716017000%81701801.2%918019000%1019020000%-Mode

0 MB40 MB80 MB120 MB160 MB200 MB240 MB

0 hours

5 hours

10 hours

15 hours

20 hours

25 hoursRegistry Test: Paging Space Usage (OSF)Registry Test: Paging Space Usage (IBM)

Total paging space used (MB).

Machine paging space=228MBTime since test suite started (hours).The Registry test suite failed during both conditions.DCE daemons were restarted, and test suite executionwas resumed. The test suite execution completed withoutfurther incident.Because the tests ran fasteron the DCE/6000 platform,the failure occurred sooner.Physical RAM=64MBTotal Paging Space=228MBN=503.There are 503 observations because there are 502 test cases. Observations are obtained before the first test case, and following each subsequent test case.

0 bytes10,000,000 bytes20,000,000 bytes30,000,000 bytes40,000,000 bytes50,000,000 bytes

0 hours

5 hours

10 hours

15 hours

20 hours

25 hoursRegistry Test: Size of all DB Files (OSF)Registry Test: Size of all DB Files (IBM)

Size of DB files (bytes).Time since test suite started (hours).N=503.There are 503 observations because there are 502 test cases. Observations are obtained before the first test case, and following each subsequent test case.0 bytes10,000,000 bytes20,000,000 bytes30,000,000 bytes40,000,000 bytes50,000,000 bytes

0 hours

25 hoursRegistry Test: Size of Security DB Files (OSF)Registry Test: Size of Sec Update Log File (OSF)Registry Test: Size of Security DB Files (IBM)Registry Test: Size of Sec Update Log File (IBM)

Size of DB files (bytes).Time since test suite started (hours).N=503.There are 503 observations because there are 502 test cases. Observations are obtained before the first test case, and following each subsequent test case.

Bar:From: (>)To: (£)Count:Percent:1012.9105397%212.925.92.2%325.938.82.2%438.851.700%551.764.72.2%664.777.63.3%777.690.500%890.5103.52.2%9103.5116.410.9%10116.4129.34.4%11129.3142.32.2%12142.3155.21.1%13155.2168.14.4%14168.1181.100%15181.11941.1%-ModeBar:From: (>)To: (£)Count:Percent:11392585.2%235888.1%3575.5%4791.1%591100%6111300%-Mode

0 seconds50 seconds100 seconds150 seconds200 seconds

0 hours

4 hours

8 hours

12 hours

16 hours

20 hours

24 hours

Duration of check command (seconds).Time since test suite started (hours).LessisBetter120 seconds is 2 minutes.The Registry test suitefailed during Case 473.DCE daemons were re-started, and executionof the test suite wasresumed. The test suite execution completedwithout further incident.the interval between observations is longer because it requiresmore than 60 seconds for the rgy_edit view command to return.N=1087The number of observations depends on the duration of the testsuite. Data are usually obtained every 60 seconds. Occasionally,0 seconds1 seconds2 seconds3 seconds4 seconds5 seconds6 seconds

0 hours

5 hours

10 hours

15 hours

Duration of check command (seconds).Time since test suite started (hours).N=1087

0 hours

5 hours

10 hours

15 hours

20 hours

Percent of Max ValueTime since test suite started, in hours.The update_log increasesuntil a checkpoint duringwhich it is emptied.The registry database filesgrow only during thecheckpoint operation.The time it takes for argy_edit -a -v cell_admincommand to return remainsalmost constant except duringregistry checkpoints.0%100%0%100%0%100%0%100%0%100%0%100%The time required to executea test case remains virtuallyconstant except duringregistry checkpoints.Paging space usage continuesto climb until secd dies. Usage drops when secd is restarted.Virtual memory usagecontinues to climb untilsecd dies. Usage dropswhen secd is restarted.

100 minutes110 minutes120 minutes130 minutes140 minutes150 minutes# 0# 2# 4# 6# 8# 10OSF Inter-Checkpoint TimeIBM Inter-Checkpoint Time

Inter-Checkpoint TimeCheckpointOSF: N=9IBM: N=84000 entries4500 entries5000 entries5500 entries6000 entries6500 entries# 0# 2# 4# 6# 8# 10OSF Inter-Checkpoint Entry CountIBM Inter-Checkpoint Entry Count

Inter-Checkpoint Entries (Count)CheckpointOSF: N=9IBM: N=8

Bar:From: (>)To: (£)Count:Percent:104394694.2%2481734.1%381221.5%412167.2%5162010.2%6202410.2%724287.2%828326.1%932363.1%1036404.1%1140443.1%-Mode