CITI Technical Report YY-##

Title – 1 inch left and right indentation, Times 14 pt.

Author names – Times Italic 10 pt ema i l @umi c h. e du - Cour i e r N e w 10 pt

ABSTRACT

Abstract text. Leave a line between paragraphs. Times 10 pt. 1 inch left and right indentation. Leave 3 lines after abstract before date. Leave enough space after date so that CITI’s address is the last 4 lines of the cover page.

If the title and authors fit within the box, it will show through the cover sheet window. Delete the box after you are finished. It starts 2 inches from the top of the page, is 4.75 inches in height, and 5 inches wide.

February 1, 2005

Center for Information Technology Integration

University of Michigan 535 W. William St., Suite 3100 Ann Arbor, MI 48103-4978